<template>
 <div class="listcontain">
    <headBar :title=title></headBar>
    <div class="listcon">
        <paperList :url=url :emptyimg=emptyimg :emptytxt=emptytxt :needTop="false" parameter=""></paperList>
    </div>
   
</div>
</template>
<script setup>
import historyb from '../assets/historyb.png'
import readb from '../assets/readb.png'
import collectb from '../assets/collectb.png'
import { useRoute } from 'vue-router';
import {WXSHAREHOME} from '../utils/wxshare-1.6.0';
import {fromwexin,roootUrl} from '../utils/api.js'
const title = ref('')
const emptyimg = ref('')
const emptytxt = ref('')
const router = useRoute();
const url=ref('')
onMounted(() => {  
    title.value = router.query.type;
    if( title.value=='浏览记录')
    {
        emptytxt.value='暂无浏览记录'
        emptyimg.value=historyb
        url.value='/article/queryClickArticle'
    }
    else if( title.value=='我的收藏')
    {
        emptytxt.value='您还未添加收藏'
        emptyimg.value=collectb
        url.value='/article/queryColectArticle'
    }
    else if( title.value=='确认已读')
    {
        emptytxt.value='暂无已读'
        emptyimg.value=readb
        url.value='/article/queryReadArticle'
    }
    }); 

    WXSHAREHOME( title.value, '肝胆相照-肝胆病在线公共服务平台', roootUrl + localStorage.getItem("officeid") + '&appid=' +localStorage.getItem("appid")+fromwexin,"");
</script>
<style scoped>
.listcontain{
  display: flex;
  height: 100vh;
  flex-direction: column;
}
.listcon{
  flex: 1;
  overflow-y: scroll;
  -webkit-overflow-scrolling: touch;
}
.t-pull-down-refresh {
    overflow: hidden;
    height: auto;
}
</style>